!TITLE!EVS Multicam _DETECTED_VERSION_ Startup Menu
#BOOT#Boot Multicam _DETECTED_VERSION_,5
#MAINTENANCE_MENU#Maintenance
 #CHANGE#Change active version
  #POOL#@LIST c:\versions\*.*
 #DOS#Dos Prompt
 #CEONLY#Start OS with PC LAN support (no Multicam)
#SUPPORT#Support
##

[BOOT]
%VGA2TVEXE%
c:
cd c:\lsmce\os
CeLoader /x /z /j /vm:dt /kb:%KBDLAYOUT% /B:0 /C:1 /n:%HOSTNAME% /e:%NET_IOBASE%:%NET_IRQ%:%NET_IP% /sm:%NET_MASK% /gw:%NET_GATEWAY% detect
EXIT

[DOS]
cd c:\
cls
EXIT

[CEONLY]
%VGA2TVEXE%
c:
cd c:\lsmce\os
CeLoader /j /vm:dt /kb:%KBDLAYOUT% /B:0 /C:1 /n:%HOSTNAME% /e:%NET_IOBASE%:%NET_IRQ%:%NET_IP% /sm:%NET_MASK% /gw:%NET_GATEWAY% detect
EXIT

[SUPPORT]
set MENULOOP=1
cls
if exist c:\lsmce\const\support\support.txt goto DISPLAY_SUPPORT
echo file c:\lsmce\const\support\support.txt not found
goto END
:DISPLAY_SUPPORT
type c:\lsmce\const\support\support.txt | more
:END
pause
EXIT

[POOL]
cls
set SOURCE_DRIVE=c:\versions\%MENUITEMNAME%
set DESTINATION_DRIVE=c:
set MENULOOP=1
set CURRENT_OS_TYPE=WCE
call %SOURCE_DRIVE%\SCRIPTS\REINSTAL.BAT
echo.
echo System updated.
seconds 1
reset
EXIT