   KPG-56D Help File  Version 2.10
   File name: KPG56D_2.HLP

New File Help (CLEAR FILE)
This function clears all data currently shown in the channel 
information window and restores the defaults.

1. Select "New" then press [Enter], or simply press [N].
   A warning message appears.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O] 
   or [C].

Load Help
The Load function reads a data file saved on a hard disk or floppy 
disk, then writes the file into the buffer memory of your computer.
You may change the loaded file, write it to the transceiver, or print 
it out.

1. Select "Load" then press [Enter], or simply press [L].
   The "Drive & Path" window opens, and displays the currently 
   selected drive and path name.
2. Type the drive and path name of the desired file, then press 
   [Enter].
   The "Directory" window opens and displays the name(s) of the 
   file(s) on that path.
   Data files have "DAT" extensions.

Note 1:  If the entered drive does not contain a disk, an error 
         message appears.
         Press any key, insert the correct disk in the specified 
         drive, then press [Enter].
Note 2:  If the entered drive or path does not exist, an error message 
         appears.
         Press any key, correct the drive or path name, then press 
         [Enter].
Note 3:  If no file is found under the drive and path name, an error 
         message appears.
         Press any key, correct the drive and path names, then press 
         [Enter].

3. Select the desired file name, then press [Enter].
   The "Load file name" window opens.
4. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O] 
   or [C].

Save Help
The Save function saves the created or revised file to the drive, 
path, and file names previously selected (or default).

1. Select "Save(=F4)" then press [Enter], or simply press [S] or [F4].
   The "Save file name" window opens.
   
Note:  If the same file name exists under the current path, a warning 
       message appears.

2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O] 
   or [C].

Save as Help
The save As function saves the current file to the drive, path, and 
file names that you specify.

1. Select "save As" then press [Enter], or simply press [A].
   The "Drive & Path" window opens and displays the currently selected 
   drive and path names.
2. Type the desired drive and path names, then press [Enter].
   The "Save file name" window opens.

Note 1:  If the entered drive does not contain a disk, an error 
         message appears.
         Press any key, insert the correct disk in the specified 
         drive, then press [Enter].
Note 2:  If the entered drive or path does not exist, an error message 
         appears.
         Press any key, correct the entered drive or path name, then 
         press [Enter].

3. Type the desired file name, then press [Enter].
   The "Save file name" window opens.

Note 1:  If the same file name exists under the specified path, a 
         warning message appears.
Note 2:  If you prefer, press [F9] to open the "Directory" window.
         Select the desired file name, then press [Enter] twice.

4. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O] 
   or [C].

Delete Help
The Delete function allows you to delete unnecessary files from the 
desired disk thereby freeing up disk space.

1. Select "Delete" then press [Enter], or simply press [D].
   The "Drive & Path" window opens and shows the currently selected 
   drive and path name.
2. Type the desired drive and path name, then press [Enter].
   The "Directory" window opens.

Note 1:  If the entered drive does not contain a disk, an error 
         message appears.
         Press any key, insert the correct disk in the specified 
         drive, then press [Enter].
Note 2:  If the entered drive or path does not exist, an error message 
         appears.
         Press any key, correct the drive or path name, then press 
         [Enter].
Note 3:  If no file exists under the drive and path name, an error 
         message appears.
         Press any key, correct the drive and path names, then press 
         [Enter].

3. Select a file name using the up- or down-arrow key, then press 
   [Enter].
   The "Delete file name" window opens.
4. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O] 
   or [C].
   After erasing the last file in the current directory, the channel 
   information window opens; otherwise the "Directory" window opens 
   again.
5. Repeat step 3 and 4 to delete all unnecessary files.

Print Help
The Print function directs data to the printer.
The data may have been created, loaded from a disk, or read from the 
transceiver.
The information that you can print includes the followings:

* File name
* Model name
* Optional features
* Key assignment
* Scan information
* DTMF
* 2-Tone
* SmarTrunk II
* Test frequency
* Embedded message
* Group information

1. Select "Print(=F5)" then press [Enter], or simply press [P].
   The "Print out list" window opens.
2. Press the up- or down-arrow key to highlight the setting to be 
   changed.
3. Press [SPACE BAR] or [F2] to select "[Yes]" for printing or "No" 
   for canceling the print operation.
4. At the bottom of the Print out list window,
   type the desired start group, then press [Enter].
   Type the desired  end group, then press [Enter].
5. Press [F5] to open the "Edit data print out" window.
6. Select "[Ok]" or "[Cancel]".

Note:  If the printer is not ready, an error message will appear.
       Check the printer, then select "[Ok]" or "[Cancel]".

"SmarTrunk & SmarTrunk II are registered trademarks of
SmarTrunk Systems, Inc., Hayward, California, U.S.A.".

Go to Dos Help
The "Go to dos" function allows you to temporarily exit the program 
and go back to the DOS prompt.

1. Select "Go to dos" then press [Enter], or simply press [G].
   The "Type EXIT to return to FPU" message and the DOS prompt appear.
2. To restore the previous screen, type "exit" then press [Enter].

Note:  The KPG-56D software can support this command only when your 
       computer has sufficient memory.

Exit Help
The eXit function quits the program completely and restores the DOS 
prompt.

1. Select "eXit (=F3)" then press [Enter], or simply press [X].
   The "Return to DOS!" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

TK-762G/K Help
Frequency range
 1: 148 - 174MHz
 2: 136 - 162MHz

This VHF transceiver can be programmed with up to 8 channels.

1. Select "TK-762G[VHF:8CH]K" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-762G/E Help
Frequency range
 1: 146 - 174MHz

This VHF transceiver can be programmed with up to 8 channels.

1. Select "TK-762G[VHF:8CH]E" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-762G/(N)E Help
Frequency range
 1: 146 - 174MHz

This VHF transceiver can be programmed with up to 8 channels.

1. Select "TK-762G[VHF:8CH](N)E" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-768G/M Help
Frequency range
 1: 148 - 174MHz
 2: 136 - 162MHz

This VHF transceiver can be programmed with up to 8 channels.

1. Select "TK-768G[VHF:8CH]M" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".


TK-760G/K Help
Frequency range
 1: 148 - 174MHz
 2: 136 - 162MHz

This VHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-760G[VHF:128CH]K" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-760G/M Help
Frequency range
 1: 146 - 174MHz

This VHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-760G[VHF:128CH]M" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-760G/(N)E Help
Frequency range
 1: 146 - 174MHz

This VHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-760G[VHF:128CH](N)E" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-768G/C Help
Frequency range
 1: 148 - 174MHz
 2: 136 - 162MHz

This VHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-768[VHF:128CH]C" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-862G/K Help
Frequency range
 1: 450 - 490MHz
 2: 485 - 512MHz

This UHF transceiver can be programmed with up to 8 channels.

1. Select "TK-862[UHF:8CH]K" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-862G/E Help
Frequency range
 1: 440 - 470MHz

This UHF transceiver can be programmed with up to 8 channels.

1. Select "TK-862[UHF:8CH]E" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-862G/(N)E Help
Frequency range
 1: 440 - 470MHz

This UHF transceiver can be programmed with up to 8 channels.

1. Select "TK-862[UHF:8CH](N)E" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-868G/M Help
Frequency range
 1: 450 - 490MHz
 2: 400 - 430MHz

This UHF transceiver can be programmed with up to 8 channels.

1. Select "TK-868G[UHF:8CH]M" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".


TK-860G/K Help
Frequency range
 1: 450 - 490MHz
 2: 485 - 512MHz
 3: 400 - 430MHz

This UHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-860G[UHF:128CH]K" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

Caution! : Do not program the frequency range from 406.0 to 406.1 MHz
           because they are reserved for another service.

TK-860G/M Help
Frequency range
 1: 450 - 490MHz
 2: 485 - 520MHz
 3: 400 - 430MHz

This UHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-860G[UHF:128CH]M" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-868G/C Help
Frequency range
 1: 450 - 490MHz
 2: 400 - 430MHz

This UHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-868G[UHF:128CH]C" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".


TK-260G/K Help
Frequency range
 1: 150 - 174MHz
 2: 136 - 150MHz

This VHF transceiver can be programmed with up to 8 channels.

1. Select "TK-260G[VHF:8CH]K" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-260G/M Help
Frequency range
 1: 150 - 174MHz

This VHF transceiver can be programmed with up to 8 channels.

1. Select "TK-260G[VHF:8CH]M" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-260G/E Help
Frequency range
 1: 146 - 174MHz

This VHF transceiver can be programmed with up to 8 channels.

1. Select "TK-260G[VHF:8CH]E" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-260G/(N)E,(N)T
Frequency range
 1: 146 - 174MHz
 2: 136 - 150MHz

This VHF transceiver can be programmed with up to 8 channels.

1. Select "TK-260G[VHF:8CH](N)E,(N)T" using the up- or down- arrow 
   key, then press [Enter].
   The "VHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-270G/K Help
Frequency range
 1: 150 - 174MHz
 2: 136 - 150MHz

This VHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-270G[VHF:128CH]K" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-270G/M Help
Frequency range
 1: 150 - 174MHz
 2: 136 - 150MHz

This VHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-270G[VHF:128CH]M" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-270G/E Help
Frequency range
 1: 146 - 174MHz

This VHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-270G[VHF:128CH]E" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-270G/(N)E,(N)T Help
Frequency range
 1: 146 - 174MHz

This VHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-270G[VHF:128CH](N)E,(N)T" using the up- or down- arrow
   key, then press [Enter].
   The "VHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-278G/M Help
Frequency range
 1: 150 - 174MHz
 2: 136 - 150MHz

This VHF transceiver can be programmed with up to 16 channels in
various combinations of groups.

1. Select "TK-278G[VHF:16CH]M" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-278G/C Help
Frequency range
 1: 150 - 174MHz
 2: 136 - 150MHz

This VHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-278G[VHF:128CH]C" using the up- or down- arrow key,
   then press [Enter].
   The "VHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a VHF model to a UHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".


TK-360G/K Help
Frequency range
 1: 450 - 470MHz
 2: 470 - 490MHz
 3: 490 - 512MHz
 4: 403 - 430MHz

This UHF transceiver can be programmed with up to 8 channels.

1. Select "TK-360G[UHF:8CH]K" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

Caution! : Do not program the frequency range from 406.0 to 406.1 MHz
           because they are reserved for another service.

TK-360G/M Help
Frequency range
 1: 450 - 470MHz
 2: 470 - 490MHz
 3: 403 - 430MHz

This UHF transceiver can be programmed with up to 8 channels.

1. Select "TK-360G[UHF:8CH]M" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-360G/E Help
Frequency range
 1: 440 - 470MHz
 2: 403 - 430MHz

This UHF transceiver can be programmed with up to 8 channels.

1. Select "TK-360G[UHF:8CH]E" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-360G/(N)E Help
Frequency range
 1: 440 - 470MHz
 2: 403 - 430MHz

This UHF transceiver can be programmed with up to 8 channels.

1. Select "TK-360G[UHF:8CH](N)E" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-370G/K Help
Frequency range
 1: 450 - 470MHz
 2: 470 - 490MHz
 3: 490 - 512MHz
 4: 403 - 430MHz

This UHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-370G[UHF:128CH]K" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

Caution! : Do not program the frequency range from 406.0 to 406.1 MHz
           because they are reserved for another service.

TK-370G/M Help
Frequency range
 1: 450 - 470MHz
 2: 470 - 490MHz
 3: 490 - 520MHz
 4: 403 - 430MHz

This UHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-370G[UHF:128CH]M" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-370G/E Help
Frequency range
 1: 440 - 470MHz

This UHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-370G[UHF:128CH]E" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-370G/(N)E Help
Frequency range
 1: 440 - 470MHz

This UHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-370G[UHF:128CH](N)E" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-378G/M Help
Frequency range
 1: 450 - 470MHz
 2: 400 - 420MHz

This UHF transceiver can be programmed with up to 16 channels in
various combinations of groups.

1. Select "TK-378G[UHF:16CH]M" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".

TK-378G/C Help
Frequency range
 1: 450 - 470MHz
 2: 400 - 420MHz

This UHF transceiver can be programmed with up to 128 channels in
various combinations of groups.

1. Select "TK-378G[UHF:128CH]C" using the up- or down- arrow key,
   then press [Enter].
   The "UHF" window opens.
2. Trunking is not available as standard.
   Select "[Yes]" or "[No]", or simply press [Y] or [N].
   A confirmation window appears.
3. Select "[Ok]" or "[Cancel]" then press [Enter], or simply press [O]
   or [C].

Note:  When switching from a UHF model to a VHF model, or changing a 
       radio band or vice versa, a warning message appears to remind 
       you that all data or frequency data currently displayed will be
       cleared from the screen.
       Select "[Ok]" or "[Cancel]".


End Of Help File
