   KPG-59D Help File  Version 2.10  3rd Release.


   File name: KPG59D_4.HLP



Priority Help
Select the Priority channel.

None    : No Priority channel.
Fixed   : Priority channel is a fixed channel.
          Set that channel in the Channel Edit window.
          Move the cursor to the desired channel in the
          Channel Information screen, then press F10 
          (Channel Edit window opens) and set
          "Priority Channel" to "On" in Channel Edit.
Selected: The Selected channel becomes Priority.
Default : None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Look Back Time A Help
Priority channel check interval while receiving on a
non-priority channel.
The transceiver's CPU chooses either Lookback time A
or B depending on the priority channel activity
--Program both times.
Priority channel is not busy (no carrier detected).
This time is typically set shorter than Lookback B, since
the priority ch. should be checked more often to prevent
missing a call.

 Range  : 0.5s to 5.0s (0.1s steps)
 Default: 0.5s

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

Note: During the OST Select mode, the transceiver does not watch the
      at the priority channel in the scan resume mode.

Look Back Time B Help
Priority channel check interval while receiving on a
non-priority channel.
The transceiver's CPU chooses either Lookback time A
or B depending on the priority channel activity
--Program both times.
Priority channel is busy, but tone squelched.
This time is typically set long because the priority ch. is busy
with another caller using a different QT/DQT.

 Range  : 0.5s to 5.0s (0.5s steps)
 Default: 2.0s

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

Note: During the OST Select mode, the transceiver does not
      look back at the priority channel in the scan resume mode.

Revert Channel Help
In scan mode the transceiver can be programmed to revert
to a certain channel upon PTT.
This allows the transceiver to be customized to the users
transmission requirements while using scan. 
The revert channel types are Last Called, Last Used,
Selected plus Talkback, Priority, Priority plus Talkback
and Selected.
In all cases the user has the capability to manually select
a channel for transmission.

 Last Called :
        The transceiver reverts to the channel upon which a call
        was last received even if scanning has resumed (power
        on default = selected channel). This is convenient
        for users that may commonly receive calls on several
        channels and desire the transceiver to always respond on
        the last call received (especially if the user is not
        normally able to respond immediately before scan
        resumes).

 Last Used : ( = with Talkback)
        The transceiver reverts to the channel that was last
        transmitted on (power on default = selected channel),
        however, if a call is received on a channel other
        than the last transmit channel and PTT is pressed
        before scanning resumes, the transceiver "talks back" on the
        current receive channel (scan resume time is dependent
        on the Dropout Delay and TX Dwell time settings).
        If PTT is pressed after scan resumes, the transceiver will
        transmit on the last transmit channel. This is
        convenient for users that always want to transmit on
        the channel they are currently using and do not want
        the revert channel to be constantly changed by other
        channel traffic, but need to immediately respond to
        calls on any other channel without having to determine
        which channel the call was received on and then
        manually switch to that channel.

 Selected+Talkback :
        The transceiver reverts to the channel set by the channel
        selector knob prior to scan initiation, however, if a
        call is received on a channel other than the selected
        channel and PTT is pressed before scanning resumes,
        the transceiver "talks back" on the current receive channel
        (scan resume time is dependent on the Dropout Delay
        and TX Dwell Time settings). If PTT is pressed after
        scan resumes, the transceiver will transmit on the selected
        channel. This is convenient for users who normally
        want to transmit on the selected channel, but need to
        immediately respond to calls on any other channel
        without having to determine which channel the call was
        received on and then manually switch to that channel.

 Priority :
        The transceiver always reverts to the priority channel.
        This is convenient for users that almost always need
        to transmit on the priority channel.

 Priority+Talkback :
        The transceiver always reverts to the priority channel,
        however, if a call is received on a channel other
        than the priority channel and PTT is pressed before
        scanning resumes, the transceiver "talks back" on the
        current receive channel (scan resume time is dependent
        on the Dropout Delay and TX Dwell Time settings), If
        PTT is pressed after scan resumes, the transceiver will
        transmit on the priority channel, This is convenient
        for users that almost always need to transmit on the
        priority channel, but need to immediately respond to
        calls on any other channel without having to determine
        which channel the call was received on and then
        manually switch to that channel.

 Selected :
        The transceiver reverts to the channel set by the channel
        selector knob (TK-190 only), Channel Up/Down key and
        Home Channel key prior to scan initiation.

 Default  : Last Called

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Dropout Delay Time Help
Dropout Delay Time is the interval from the end of a received call
to the time scan automatically resumes.

Range  : 0.5s to 5.0s (0.5s steps)
Default: 3.0s

Note: To receive DTMF Individual/Group Call or Dead Beat Disable,
      the Dropout Delay Time needs to be set for sufficient time.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

Dwell Time Help
TX Dwell Time is the interval from the end of the transmission
to the time scan automatically resumes.

Range  : 0.5s to 5.0s (0.5s steps)
Default: 3.0s

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

AC Control Help
During priority scan, the transceiver checks the priority channel
for activity by detecting carrier and/or QT/DQT tone coded squelch
signalling. AC control allows the transceiver to check for "carrier-
only" when checking the priority channel to achieve a faster
detection of priority channel activity.

Yes    : [Disables QT/DQT checking always]-
         The radio disables QT/DQT detection when checking the
         priority channel during the scan sequence and priority
         lookback;
         i.e. carrier squelch only.
No     : The radio checks for carrier and QT/DQT signalling at
         all times during the scan sequence and priority lookback.
Default: No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note1: "Priority" must be set to "Fixed" or "Selected" before
       AC Control can be set.

Note2: Select "Off" if there is heavy traffic on the priority
       channel or you may miss your call since signalling is not
       being detected.

Priority Temporary Delete/Add Help
This function allows the operator to temporarily change "Delete" and
"Add" on the Priority Channel during scan.
Select "Priority" to "Fixed" or "Selected" before setting this item.
If the transceiver stops scan on Priority channel by nuisance
signals, and Priority temporary Delete/Add is permitted, press
(or press and hold) the D/A function key. (Hold time is set on
"Temp. D/A Key Hold Time."TK-190 only)
The transceiver deletes that channel and re-starts scanning.

Yes    : The operator can change "Delete" and "Add" on Priority
         in scan mode.
No     : The operator can not change "Delete" and "Add" on Priority
         in scan mode.
Default: No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note: When the transceiver exits from Scan Mode, the channel returns
      to the previous "Delete/Add" setting.

Revert Channel Display Help
Select main display in scan mode.

On     : The transceiver indicates the revert channel on the channel
         display in the scan mode.
Off    : The transceiver indicates " SCAN " on the channel display in
         the scan mode.
Default: Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Temporary Delete/Add Key Hold Time Help
"Priority Temp. Del/Add" and "Temporary Del/Add" is activated when
the [Delete/Add] key is held down and Temporary Delete/Add Key Hold
Time setting is exceeded.

Range  : 0.0s to 2.0s (0.5s steps)
Default: 0.5s

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

Note: When the transceiver exits from Scan Mode, the channel returns
      to pre-set "Delete/Add".

Off Hook Scan Help
The transceiver is able to scan even though the microphone is in the
off hook condition.

 Enable : Scanning is not controlled by microphone hook status.
          The transceiver always scans, and stops only by signal
          presence.
 Disable: The microphone must be on hook for scanning.
 Default: Disable.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Power On Tone Help
Selects the beep tone volume level that sounds when 
the transceiver is turned ON.

Continuous: A power-on tone sounds at the level set by VOL.
            control.
0-31      : A power-on tone sounds with the selected level.
Default   : Continuous 

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Control Tone Help
Selects the beep tone volume level that sounds when 
a key is pressed.

Control Tone: Function key echo, Operational error beep,
              Roll over tone

Continuous: A control tone sounds at the level set by the VOL.
            control.
0-31      : A control tone sounds with the selected level.
Default   : Continuous 

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Warning Tone Help
Selects the volume level of the "Warning" tone,

Warning Tone :Un-programmed channel warning, Time out timer,
              TOT pre-alert, Transmission warning (no TX frequency
              data, Busy Channel Lockout, Dead Beat Disable or
              Battery low warning) 

Continuous: A warning tone sounds at the level set by the VOL.
            control.
0-31      : A warning tone sounds with the selected level.
Default   : Continuous 

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Alert Tone Help
Selects the beep tone volume level that sounds when 
the transceiver is called by either 2-Tone or DTMF signalling.

Continuous: An alert tone sounds at the level set by the VOL.
            control.
0-31      : An alert tone sounds with the selected level.
Default   : Continuous 

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Minimum Volume Help
This parameter sets the minimum volume level when the Volume control
is adjusted to its minimum position.

Range  : 0 to 31 (steps of 1)
Default: 0

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

Note: Minimum Volume level will be reduced by pressing the 
      [SP Attenuation] key. (TK-190 only)

Squelch Level Help
Set the preset Squelch level. 
It is variable in the user mode.
Refer to "Squelch Level" in the key assignment screen.

Range  : 0 to 15 (steps of 1)
Default: 1

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

Time Out Timer(TOT) Help
This selects the period of time users can continuously transmit.  
When the selected period elapses, the transceiver generates an
"Alert" tone and stops transmitting.

Range  : Off/30 to 300 sec. (30 sec. steps)
Default: 60 sec.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

Note1: If you set this parameter to "Off", the transceiver
       will stop transmission after 10 minutes (TK-190).
       20 minutes (TK-6110).

Note2: If "Optional features/Warning Tone" is set to "0", the 
       transceiver will not generate an "Alert" tone.

TOT Pre-Alert Help
This selects the time at which the transceiver generates 
a "Pre-Alert" tone before TOT expires.
TOT will expire when the selected time passes after a "Pre-Alert" 
tone.

Range  : Off/1 to 10 sec. (1 sec. steps)
Default: Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

TOT Rekey Time Help
This selects the "penalty" time in which the transceiver cannot be 
re-keyed to transmit after the TOT setting is exceeded.

Range  : Off/1 to 60 sec. (1 sec. steps)
Default: Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

TOT Reset Time Help
TOT Reset Time selects the minimum "wait" time allowed between 
transmissions that will reset the TOT count.
When this is set, the TOT continues even after PTT is released 
unless the TOT Reset Timer has expired.

Range  : Off/1 to 15 sec. (1 sec. steps)
Default: Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

Signalling Help
Signalling "AND"/"OR" sets the audio unmute condition for any channel
programmed for 2-Tone or DTMF decode (option signalling). 

AND    : "AND" requires both the valid Opt.Signalling and the
         programmed QT/DQT to be received for audio to unmute (and
         initiate an Opt.Sig. decode alert).
OR     : "OR" requires either the valid Opt. Signalling or the
         programmed QT/DQT to be received for audio to unmute (an
         Opt. Sig. alert is only initiated if the proper Opt. Sig.
         is decoded).
Default: OR

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Busy Channel Lockout Override Help
You can transmit in spite of a Busy Channel Lockout situation.
Example; To make an Emergency voice call.
         To transmit during Busy Channel Lockout, press the PTT again
         within approx. 500ms after initial PTT release.

On     : The BCL override function is enabled
Off    : The BCL override function is disabled
Default: Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Data Password Help
The Data Password prevents unauthorized reading of the programmed 
transceiver data.  You can enter a maximum of 6 digits in the range 
of 0 to 9.
To read a password protected transceiver you must enter the correct 
password first.  This password protection does not prevent writing 
program data to a transceiver, nor does it prevent cloning capability.
Cloning mode can be disabled by setting "Optional features/Mode/Clone"
to "Disable".

Enter the required password with the keyboard, then press [Enter].

Roll Over/Dead End Help
This parameter is a selection of the channel changing.

Roll Over: When [Channel UP] key is pressed from the maximum channel,
           the channel changes to the minimum channel.
           When [Channel DOWN] key is pressed from the minimum
           channel, the channel changes to the maximum channel.

           When Side1 key (TK-190), UP key (TK-6110) is pressed from
           maximum code in Operator Selectable Tone select mode and
           Scrambler Code select mode, the code changes to minimum
           code.
           When Side2 key (TK-190), DW key (TK-6110) is pressed from
           minimum code in Operator Selectable Tone select mode and
           Scrambler Code select mode, the code changes to maximum
           code.

Dead End : When [Channel UP] key is pressed from the maximum channel,
           the channel does not change.
           When [Channel DOWN] key is pressed from the minimum
           channel, the channel does not change.

           When Side1 key (TK-190), UP key (TK-6110) is pressed from
           maximum code in Operator Selectable Tone select mode and
           Scrambler Code select mode, the code does not change.
           When Side2 key (TK-190), DW key (TK-6110) is pressed from
           minimum code in Operator Selectable Tone select mode and
           Scrambler Code select mode, the code does not change.

Default  : Roll Over

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note: This parameter does not work for Squelch Level Adjustment mode.
      Squelch Level Adjustment mode works for Dead End.

Sub LCD Display Help
Select the display contents.

Channel: Sub LCD display shows the channel number.
None   : Nothing is displayed on the sub LCD display.
Default: None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note1: Additional display characters.
       "TA" indicates Talk Around function is ON.
       "HC" indicates Home Channel function is ON.
       "P"  indicates Priority is set.
       In order of precedence is;
       TA > HC > P

Note2: When Channel number is set to the Sub LCD display,
       displays Channel number for 2 seconds after changing
       channel. Then displays "TA", "P" if it is set.

Emergency CH Display Help
This parameter is a selection of the LCD display and TX LED in the
Emergency Mode.

On     : The LCD shows the Channel Name of the Emergency Channel.
         The TX LED turns on during the transmission.
Off    : Display does not indicate Emergency Mode on the display.
         LCD shows the CH Name or CH No. of the channel which is
         selected before entering the Emergency Mode.
         The TX LED does not turn on during the transmission.
Default: Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note: The Emergency Mode works when an ANI Board is installed.

Clear to Transpond Help
The transceiver will wait when the channel is busy, then transponds
when the channel becomes open. See the 2-Tone or DTMF menu for the
Transpond feature.

Yes    : Enable the Clear to Transpond feature.
No     : Disable the Clear to Transpond feature.
Default: No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Off Hook Decode Help
The transceiver is able to decode QT/DQT even though the microphone
is in the off hook condition.

Enable : Decode QT/DQT is not controlled by microphone hook status.
Disable: The microphone must be on hook for decoding signallings.
Default: Disable.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note: 2-Tone/DTMF is enabled decoding regardless of the microphone
      hook status.

Noise Blanker Help
This function removes a pulse noise from the receiver audio.

On     : Enable the Noise Blanker feature.
Off    : Disable the Noise Blanker feature.
Default: On

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Off Hook Horn Alert Help
The Horn Alert is activates when the transceiver is called with
option signalling even though the microphone is in the off hook
condition.

Enable : Horn Alert action is not controlled by microphone hook
         status.
Disable: The microphone must be on hook for Horn Alert action.
Default: Disable.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Ignition Sense Help
If you connect your vehicle iginition line to the connector on the 
rear panel of your trsansceiver, you can automatically turn your
transceiver ON (or OFF) by linking with the Iginition ON (or OFF)
using this Ignition Sense mode.

Yes    : By linking with the Iginition ON (or OFF), your transceiver
         automatically turns ON (or OFF). You can set a delay time
         from Ignition OFF to transceiver power OFF. Select the delay
         time from 0 to 8 hours in the "Timed Power Off" menu.
No     : Your transceiver power is not linked with the Ignition ON
         (or OFF). You can only switch the transceiver power ON (or
         OFF) by using the Power switch.
Default: No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Timed Power Off Help
Timed Power Off timer starts from the ignition-off. After the timer
expires, the transceiver will be automatically turned off. The timer
will be reset if the ignition is turned on and off.

Range  : 0 to 8 hour. (1 hour. steps)
Default: 0

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

Note1: This function requires ignition sense. Connect the ignition-
       line to the transceiver using KCT-18 (Optional cable).

Note2: If the ignition-line is not connected to the transceiver
       and this parameter is set as 1-8 hour, the Timed Power Off
       function will perform.
       After the timer expires, press Power SW or ignition on
       to turn the transceiver on.

Note3: If the ignition-line is not connected to the transceiver
       and this parameter is set as 0 hour, the operator can not
       turn on the transceiver by pressing the Power SW.

Ext. PTT w/Mic Mute Help
This parameter selection of Mic mute ON/OFF when the transceiver
transmits by Acc PTT.

Yes    : The microphone is muted.
No     : The microphone is not muted.
Default: No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Ext. PTT w/QT/QDT Help
This parameter selection of QT/DQT encoding ON/OFF when the
transceiver transmits by Acc PTT.

Yes    : The transceiver encodes the QT/DQT.
No     : The transceiver does not encode the QT/DQT.
Default: Yes

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Ext. PTT w/STE Help
This parameter selection of Squelch Tail Eliminate ON/OFF when the
transceiver returns to receiving from transmitting by Acc PTT.

Yes    : The transceiver encodes the Squelch Tail Eliminator.
No     : The transceiver does not encode the Squelch Tail Eliminator.
Default: Yes

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Horn Alert Logic Sig Help
Horn Alert is activated when the transceiver is called with
option signalling.
This parameter is a selection of the Horn Alert relay SW action.

Continuous: The relay SW is ON continuously.
            The reset time of the relay SW can be selected.
            Until Reset: The relay SW turns off when option
                         signalling is reset.
            1 - 30 sec : The relay SW turns off when the selected
                         time is passed.

Pulse     : The relay SW repeats ON and OFF three times.
            (500msec duty)

Default   : Continuous (Until Reset)

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Selective Call Alert LED Help
This selects whether or not the LED on the transceiver flashes
orange when a 2Tone Call or DTMF Selective Call has occurred.

Yes    : The LED flashes orange.
No     : The LED does not flash.
Default: Yes

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Battery Warning Help
Enable:
 --- Low Voltage Warning ---    --- Battery Condition ---

    The red LED flashes         The battery voltage is low but 
    during transmission.        the transceiver is still usable. 

    The red LED flashes and     The battery voltage is too low and 
    a continuous beep tone      the transceiver is not usable 
    sounds while pressing       to make calls.
    the PTT.

Disable: The LED warning function, beep tone warning function and
         transmit inhibit function do not work.
Default: Enable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Busy LED Help
Enable or disable the Busy LED function.

On     : The green LED lights while receiving.
Off    : The green LED does not light while receiving.
Default: On

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

TX LED Help
Enable or disable the TX LED function.

On     : The red LED lights while transmitting.
Off    : The red LED does not light while transmitting.
Default: On

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Invert Display Help
Select the display direction.

Enable : Main LCD display and sub LCD display are inverted.
Disable: Displays are normal.
Default: Disable

Note: This (Invert Display) setting is not affected
      when the "Invert Display" function is set to the toggle
      switch.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

External Speaker Help
This selects the optional speaker-microphone's speaker activation.

Enable : The external speaker is active and the internal speaker is 
         inactive when connecting the optional speaker-microphone.
Disable: The external speaker is inactive even if connected,
         but the internal speaker is active.
Default: Enable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Noise Canceling Mic Help
Enable or Disable the Noise Canceling Mic function (internal mic).
This setting does not affect the optional speaker-microphone.
The Noise Canceling Mic function of the optional speaker-microphone
is always enabled.

Enable : The Noise Canceling Mic function is enabled.
Disable: The Noise Canceling Mic function is disabled.
Default: Enable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Scrambler Back Up Help
Enable or Disable the Scrambler ON/OFF back up for each channel.
The operator can change ON/OFF by pressing the Scrambler function
key regardless of this setting.

Enable : The Scrambler ON/OFF which is changed by the operator
         is memorized for each selected channel.
Disable: The Scrambler ON/OFF depends on the Channel Edit/Voice
         Scrambler setting.
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Panel Test Help
Enable or Disable the Panel Test mode function. 
We recommend set to disable after set-up to save the contents. 
See the transceiver's service manual for details.

Enable : The Panel Test Mode is enabled. 
Disable: The Panel Test Mode is disabled.
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Clone Help
Enable or Disable the Clone mode function. 
We recommend set to disable after set-up to save the contents. 
See the transceiver's service manual for details.

Enable : The Clone Mode is enabled. 
Disable: The Clone Mode is disabled.
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Main Programming Help
Enable or Disable the Main Programming mode function. 
We recommend set to disable after set-up to save the contents. 
See the transceiver's service manual for details.

Enable : The Main Programming Mode is enabled. 
Disable: The Main Programming Mode is disabled.
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

ID Format Help
Select the ID format, either DTMF or ANI Board.

DTMF     : The transceiver transmits the programmed ID code by DTMF.
ANI Board: PTT ID depends on ANI Board setting. (It appears
           when ANI Board is installed)
Default  : DTMF

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

PTT ID Help
Select the PTT ID timing format.
Refer to "ID format", "BOT", "EOT" in the ID Screen, and "PTT ID
Yes/No" per channel in the Channel Edit screen.

Begin Of TX: Allows the BOT to be sent when PTT is engaged.
End Of TX  : Allows the EOT to be sent when PTT is released.
Both       : Allows the BOT to be sent when PTT is engaged 
             and the EOT to be sent when PTT is released.
Off        : BOT and EOT will not be sent.
Default    : Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Dial ID Help
Enable or disable the keypad controlled ID transmit function.
This feature requires DTMF Mic.

Press "*", "*" to transmit the Connect ID.
Press "*", "#" to transmit the Disconnect ID.

Default :Disable

Note: This function is not usable when the keypad is used for the
      Direct OST function.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

BOT Help
Enter the transceiver's  programmable Connect ID data.
DTMF:0 to 9, A, B, C, D, #, * are programmable (maximum 16 digits)

Enter the desired code using the keyboard, then press [Enter].

Note: If the "Optional features/ID/ID Format" is set to "ANI Board",
      this parameter cannot be programmed. The BOT depends on the
      ANI Board setting.

EOT Help
Enter the transceiver's programmable Disconnect ID data.
DTMF:0 to 9, A, B, C, D, #, * are programmable (maximum 16 digits)

Enter the desired code using the keyboard, then press [Enter].

Note: If the "Optional features/ID/ID Format" is set to "ANI Board",
      this parameter cannot be programmed. The EOT depends on the
      ANI Board setting.

OST Back Up Help
When this function is set to "Enable", the selected OST code is 
memorized to the channel.
If this function is set to "Disable", the selected OST code is
cleared when the channel is changed or the power switch is turned
off.

Default :Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Direct OST Help
Select to use the keypad-microphone to recall OST directly or not.
To recall OST memory 1 - 9, press the OST number directly for
1 second.
To recall OST memory 10 - 16, press "*" then press 0 - 6.
To select QT/DQT off, press "*" then press "*" again.

Example; Recall OST memory 15 : "*"  "5"

Default :Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note1: When OST memory is recalled by keypad 1 - 9,
       the "OST" icon lights and OST is turned to ON.

Note2: If keypad # is pressed, OST is turned to OFF,
       and the "OST" icon goes off.

Note3: "Keypad Auto PTT" and "Auto Dial" must be set to 
       "No" in EDIT/DTMF screen, then set "Direct OST" 
       to "Enable" to use keypad as "Direct OST".

Note4: The "Dial ID" function in Optional Feature/ID screen
       is not usable when keypad is used for the
       Direct OST function.

OST Name Help
Enter the required characters for OST.
TK-190  maximum 7 digits
TK-6110 maximum 8 digits
The codes that can be programmed are: 
 (space) * # - + / \ ( ) $ % , @ = 0 1 2 3 4 5 6 7 8 9 
 A B C D E F G H I J K L M N O P Q R S T U V W X Y Z
And the "." decimal is available for each digit.

Note: If you set nothing for the "OST Name", the transceiver displays
      the tone number instead of the OST Name.

QT/DQT Decode(OST) Help
 QT : 67.0 to 250.3Hz (in 0.1Hz steps)
 DQT: codes 000 to 777
      (defaults to normal codes) 
      enter D###N (normal)
            D###I (inverted)
Enter the value directly.
   ex1. QT           [1][5][1][.][4][ENTER] for 151.4Hz
   ex2. DQT normal   [D][0][2][3][N][ENTER] or 
                     [D][0][2][3][ENTER] for 023 normal
   ex3. DQT inverted [D][7][5][4][I][ENTER] for 754 inverted
        -or-
Press [F2] to open the QT/DQT list, and then select.
 QT : 67.0 to 250.3Hz
 DQT: codes 023 to 754 

QT/DQT Encode(OST) Help
 QT : 67.0 to 250.3Hz (in 0.1Hz steps)
 DQT: codes 000 to 777
      (defaults to normal codes) 
      enter D###N (normal)
            D###I (inverted)
Enter the value directly.
   ex1. QT           [1][5][1][.][4][ENTER] for 151.4Hz
   ex2. DQT normal   [D][0][2][3][N][ENTER] or 
                     [D][0][2][3][ENTER] for 023 normal
   ex3. DQT inverted [D][7][5][4][I][ENTER] for 754 inverted
        -or-
Press the [F2] to open the QT/DQT list, and then select.
 QT : 67.0 to 250.3Hz
 DQT: codes 023 to 754 

Decoder1 Call Format Help
Select the combination of tone for Decoder1.

Range  : A, B, C, A-B, A-C
         The tone combination selected at item Decoder2 
         is excluded from this Range group.
Default: A-B

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note: If you set only one tone as Decoder1 Call Format,
      the squelch opens when the correct tone is received for 5
      seconds.

Decoder1 Call Type Help
Select Decoder Call Type. 
Set "Decoder1 Call Format" to A, B, C, A-B or A-C except None
before selecting this item.

Individual: Use 2-Tone for an Individual Call.
Group     : Use 2-Tone for a Group Call.
            The Transpond function does not work
            even if "Transpond" is set to "Yes".
            Refer to Transpond help.
Default   : Individual

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Decoder2 Call Format Help
Select the combination of tone for Decoder2.

Range  : A, B, C, A-B, A-C, None
         The tone combination selected at item Decoder1
         is excluded from this Range group.
Default: None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note: If you set only one tone as Decoder2 Call Format,
      the squelch opens when the correct tone is received for 5
      seconds.

Decoder2 Call Type Help
Select Decoder Call Type. 
Set "Decoder2 Call Format" to A, B, C, A-B or A-C except None
before selecting this item.

Individual: Use 2-Tone for an Individual Call.
Group     : Use 2-Tone for a Group Call.
            The Transpond function does not work
            even if "Transpond" is set to "Yes".
            Refer to Transpond help.
Default   : Group

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

A TONE Help
Enter the required Frequency for 2-Tone Selective Call.
Refer to Decoder1 and Decoder2 format for A, B, C combination.

Range  : 288.5 - 2840.0 [Hz]
Default: 321.7 [Hz]

B TONE Help
Enter the required Frequency for 2-Tone Selective Call.
Refer to Decoder1 and Decoder2 format for A, B, C combination.

Range  : 288.5 - 2840.0 [Hz]
Default: 928.1 [Hz]

C TONE Help
Enter the required Frequency for 2-Tone Selective Call.
Refer to Decoder1 and Decoder2 Call Format for A, B, C combination.

Range  : 288.5 - 2840.0 [Hz]
Default: 600.9 [Hz]

Call Alert Help
Selects the transceiver response when a 2-Tone Selective Call has 
occurred.

Individual Call
  Sounds a short beep tone three times. 
Group Call
  Sounds a very short beep tone seven times.

Normal    : The transceiver emits the Alert Tone once.
Continuous: The transceiver emits the Alert Tone every 5 seconds
            interval.
            All of key operation or Auto Reset action stop the
            Alert Tone.
No        : No Alert Tone action.
Default   : Normal

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Transpond Help
Selects the transceiver response when a 2-Tone Selective Call has 
occurred.
The Transpond function does not work when a Decoder Call Type
is set to Group Call. Refer to Decoder 1, 2 Call Type.

Yes    : The transceiver transmits a long beep tone one time.
         The operator can not hear it.
         The Transpond function does not work in the Emergency
         Mode, the transceiver works the Alert Tone function.
No     : No Transpond action.
Default: No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Auto Reset Help
Automatically resets the 2-Tone decoder and mutes the speaker audio
10 seconds after a valid decode. This frees the user from having to
manually reset with the monitor key. The timer starts after the
carrier drops.

On     : Enables the Auto Reset function. 
Off    : Disables the Auto Reset function. 
Default: On

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

DTMF Speed Help
This time is designed to reduce false decoder operation
by providing a fixed time period between digits,
Selectable at 6, 8, 10 or 15 digits per second.

Default: 6 digits

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

Note: If automatic DTMF encode function is used for DTMF Call,
      this parameter must be set from 6, 8 or 10 digits per second.

        automatic DTMF encode function
          TK-190 : PTT ID
          TK-6110: PTT ID, Auto Dial, Store & Send, Re-Dial

First Digit Time Help
"First Digit Time" increases the TX duration of the first digit.
(for system/decoder attack time considerations)

Example 1; 
 "Normal digit time" is set to 10 digit/sec (duration is 50ms).
 "First digit time" is set to 100ms.
 The real length of the first digit time is 150ms.

However, if a transmission starts with the "*" or "#" tone, the 
transceiver compares the tone duration with the "* and # Tone", and
adapts the longer of the two.

Example 2;
 "Normal digit time" is set to 10 digit/sec(duration is 50ms).
 "First Digit Time" is set to 100ms.
 "* and # Tone" is set to 500ms.
 The real length of the "first *" or "first #" is 550ms.

Selectable at 0,100,500 or 1000 msec

Default: (DTMF Speed +) 0 msec

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

First Digit Delay Help
The First Digit Delay sets the time delay between the start of
transmit to sending the first DTMF digit (for system/decoder attack
considerations). Making this value longer has a similar effect as
setting the First Digit Time longer. When using DTMF and QT/DQT it
is recommended to set this parameter to 100 ms or more. 

Range  : 100 to 1000 ms (50 ms steps)
Default: 100 ms

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

* and # Tone Help
"* and # Tone" increase the TX duration of the * on #.

Example 1;
 "Normal digit time" is set to 10 digit/sec(duration 50ms).
 "* and # Tone" is set to 500ms.
 The real length of the "* and # Tone" is 550ms.

However, if a transmission starts with the "*" and "#" tone, the
transceiver compares the tone duration with the "First Digit Time",
and adapts the longer of the two.

Example 2;
 "Normal digit time" is set to 10 digit/sec (duration 50ms).
 "First Digit Time" is set to 100ms.
 "* and # Tone" is set to 500ms.
 The real length of the "first *" or "first #" is 550ms.

Selectable at 0, 100, 500 or 1000 msec.

Default: (DTMF Speed +) 0 msec

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], [Shift]+[F2] or by directly entering a value.

DTMF Side Tone Help
Enable or disable the DTMF encode sidetone monitor function.

Yes     : Enable the DTMF Side Tone function.
No      : Disable the DTMF Side Tone function.
Default : Yes

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note: The transceiver sounds DTMF tones during Auto Dial setting 
      even if the "DTMF Side Tone" function is disabled.
      (TK-6110 only)

Manual Dial Help
Enable or disable "Manual Dial" transmit function.
DTMF tones can be transmitted manually with the
keypad-microphone.

Yes    : Enable the Manual Dial function.
No     : Disable the Manual Dial function.
Default: Yes

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

DTMF Hold Time Help
DTMF Hold Time holds the transmitter keyed for two seconds after
releasing a DTMF key. Press a DTMF key whether PTT is pressed or
not, the transceiver maintains transmission approx. 2 seconds after
releasing the DTMF button, even if PTT is released in the DTMF manual
operation.

On     : Enable the DTMF Hold Time function.
Off    : Disable the DTMF Hold Time function.
Default: On

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Keypad Auto PTT Help
DTMF tones are sent out exactly as entered via the keypad 
without pressing the PTT.
When using Auto Dial or Redial, the [*] key cannot be used 
to send the "*" DTMF tone.

Yes    : Enable the Keypad Auto PTT function.
No     : Disable the Keypad Auto PTT function.
Default: Yes

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note: In this case, the keypad is used for DTMF, the
      "Direct OST" function using the keypad is not available.

Store & Send Help
Store and Send function allows a DTMF number to be entered and
stored into temporary "scratch pad" memory then sent by the * key.
This is faster then manual dialing and thus conserves air time usage.

 On     : Enable the Store and Send function.
 Off    : Disable the Store and Send function.
 Default: Off.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Auto Dial Help
Enable or disable the "Automatic Dial" transmit function.
Prestored DTMF code can be transmitted automatically with a
selected DTMF keypad.
(See the instruction manual for usage)

Yes    : Enable the Auto Dial function.
No     : Disable the Auto Dial function.
Default: Yes

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Note: When the keypad is used for DTMF, the
      "Direct OST" function using the keypad in not available.

Auto Dial Programming Help
Enable or disable the operator programmable Autodial Memory.
(See the instruction manual for usage)

Yes    : Enable the Autodial Memory programming function.
No     : Disable the Autodial Memory programming function.
Default: Yes

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Auto Dial Memory Help
This is the programmable DTMF memory to send out DTMF code
automatically.
The memorized DTMF code can be sent out by the "Auto Dial"
operation.
The transceiver has 9 memories, and each memory can store maximum
16 digits of DTMF code.

Enter the required code directly.

Call Alert Help
This selects the transceiver response when a DTMF Selective Call has
occurred.

Individual Call
  Sounds a short beep tone three times. 
Group Call
  Sounds a very short beep tone seven times.

Normal    : The transceiver emits the Alert Tone once.
Continuous: The transceiver emits the Alert Tone every 5 seconds
            interval.
            All of key operation or Auto Reset action stop the
            Alert Tone.
No        : No Alert Tone action.
Default   : Normal

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Transpond Help
This selects the transceiver response when a DTMF Selective Call has
occurred.
The Transpond function does not work when called by Secondary Code.

Yes    : The transceiver transmits a long beep tone one time.
         The operator can not hear it.
         The Transpond function does not work in the Emergency
         Mode, the transceiver works the Alert Tone function.
No     : No Transpond action.
Default: No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Primary Code (Individual) Help
The primary code consists of one to seven digits
and is user-definable.
Reception of this code activates the call function.
The decoder may be reset locally by pressing the monitor key
or remotely by sending the Primary Code followed by the "#" key.

Range   : Blank, 1 - 7 Digits, (0-9, A-D, *, #)
Default : 159D

Note: To receive a DTMF Selective Call, the Dropout Delay Time
      needs to be set for sufficient time.

Enter the required code directly.

Secondary Code (Group) Help
The secondary code consists of one to seven digits
and is user-definable.
Reception of this code activates the call function.
The decoder may be reset locally by pressing the monitor key
or remotely by sending the Secondary Code followed by the "#" key.

Range   : Blank, 1 - 7 Digits, (0-9, A-D, *, #)
Default : A68*

Note: To receive a DTMF Group Call, the Dropout Delay Time
      needs to be set for sufficient time.

Enter the required code directly.

Auto Reset Help
Automatically resets the DTMF decoder and mutes the speaker audio
10 seconds after a valid decode. This frees the user from having to
manually reset with the monitor key. The timer starts after carrier
drops.

On     : Enables the Auto Reset function. 
Off    : Disables the Auto Reset function. 
Default: On

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Dead Beat Disable Help
Reception of this code places the transceiver into Dead Beat Disable
mode.
The transceiver in Dead Beat Disable mode ignores a transmit request.
Reception of reset code (Dead Beat Disable code + #) will reset this
function. 

Range  : Blank, 1 - 7 Digits, (0-9, A-D, *, #)
Default: Blank.

Note1: To receive a Dead Beat Disable code during the scan,
       the Dropout Delay Time needs to be set for sufficient time.

Note2: Reception of the D.B.D. Code activates the Transpond function
       (as a "disable acknowledgment") then disables TX.
       The Transpond function does not work in the Emergency Mode.

Enter the required code directly.

D.B.D Response(Inhibit) Help
Use this parameter to specify the operation performed by the 
transceiver when the D.B.D. Code is matched.
Reception of the D.B.D. Code activates the Transpond function (as a 
"disable acknowledgement") then disables TX or TX/RX.

TX     : Disable TX during D.B.D. mode.
TX/RX  : Disable TX/RX during D.B.D. mode.
Default: TX

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2] or [Shift]+[F2].

Embedded Message Help
This function allows you to program up to a 64 alphanumeric character
message into the transceiver. This can be used for an electric serial
number, program file name notation, property ID., etc..
The entered message is visible while running the KPG-59D software and
prints out on paper.

End Of Help File

