This section has 2 program screens: Chan.Info. (1-12) for the 1st 12 channels
;Chan. Info. (13-24) for the second 12 channels (hit F7-Next to access).
RX/TX FREQ.: type the desired freq.(MHz); hit ENTER after each entry.
FREQUENCY STEP: The PLL freq. step can be changed on any channel (hit F2
while cursor is on the ch. to be changed)
  VHF: 5 & 6.25 KHz channel steps are available (default: 5Khz).
  UHF: 5 & 6.25 KHz (10 & 12.5)channel steps are available (default: 6.25Khz)
QT/DQT FREQ.:type the desired freq.; hit ENTER after each entry.
             QT: 67-210.7 Hz @ 0.1 Hz steps.
             DQT: 000-777 octal codes; Normal or Inverted.
                  type: D###N for Normal codes
                  type: D###I for Inverted codes
SCN A/D: Fixed Add/Delete of channels for the scan map.(default=Add) 
         Note: If the "A/D" key is enabled in the SCAN INFORMATION section,
               then, A/D operation becomes "user-selectable" and any channel
               status can be changed regardless of this programmming. 
Priority Scan (status from SCAN INFORMATION SCREEN): shows Fixed, Selected,
or Not Available. A Fixed priority channel (selected in the SCAN INFO. screen)
will be indicated by "P" next to the channel frequency. The priority channel can
 be changed on any channel (hit P while cursor is on the SCN A/D to be changed.)
Frequency Type: status from RADIO BASIC INFORMATION screen; band range.
 
 
 
 
 
