     │  
     │ 
     │ 
     ├ [F 9]  ─┬ [F 2] SELECT
     │ SETUP   ├ [F 5] PRINT
     │         ├ [F10] DEFAULT
     │         └ [ESC] RETURN TO MAIN MENU
     │ 
     │ 
     ├ [F10]  ── Type 'EXIT' to return this program
     │ SHELL 
     │  
     └ [ESC]  ─┬ [ Y ] RETURN TO DOS
       EXIT    ├ [ N ] RETURN TO MAIN MENU
               └ [ESC] RETURN TO MAIN MENU
  
  
  
  
  
  
  
  


