*****RADIO BASIC INFORMATION (FREQUENCY TYPE SELECT)*****
    
         FREQUENCY TYPE                     MODEL NAME
         
          136 - 150 MHz                     TK-240D
          150 - 174 MHz                            
          400 - 430 MHz                     TK-340D
          450 - 470 MHz
          470 - 490 MHz
          490 - 512 MHz
         
          MANUAL INPUT:    <CAUTION!!!>    TK-240D/340D
          DO NOT select this and change any of the parameters;
          this is for factory programming only--hit ESC to escape. 
** Computer keys to use**
F2 or ARROW KEYS: Selects frequency type..
<ENTER>: Must hit to "locks-in" the selection made. Failure to hit enter will
         result in the previous or default freq. band to remain in the field.
ESC: Hit to return to the EDIT, CREATE, VIEW MENU to continue program data 
     entry in the next section.
 
 
 
 
 
