*****RADIO BASIC INFORMATION (MANUAL INPUT)*****
CAUTION: FOR FACTORY PROGRAMMING ONLY; SELECTING THE WRONG PARAMETERS HERE 
WILL CAUSE RADIO MISOPERATION! These parameters are automatically selected
for your radio when the band range is chosen in the previous RADIO INFO.
screen, using the manual inputs are not necessary.
Press the ESC key to return ECV menu.
      IF Fequency: DO NOT change.
      Band Change: DO NOT change.

      Initiate Frequency: LCD intial display for self-programming mode.
                        Initiate Frequency            Model Name
                               150 MHz   -------------> TK-240D
                               450 MHz   -------------> TK-340D
      Second Oscillator: DO NOT change.
      Frequency Step (@ Initiate Freq.):
                        Initiate Frequency            Frequency Steps
                               150 MHz   -------------> 5.00 KHz
                               450 MHz   -------------> 6.25 KHz
 
 
 
 
 
 
 
