[*** TOP MENU PAGE 1 ***]

!000+002
Select the required function and press the Enter key.

  1.  READ:  Read setup data.

  2.  SETUP:  Make settings of the setup data.

  3.  WRITE:  Write setup data.

  4.  SYSTEM:  Specify which set of setup data the tally box (BKDS-7700) 
               will use to operate.  Rewrite flash memory.

  5.  SINGLE SHOT:  Change the setup data and send to the tally box in real
                    time.


      See page 2 for details of basic menu operations.


[*** TOP MENU PAGE 2, 3 ***]

!
Basic menu operations
  The following are the basic operations you can carry out in the menu
  screens.

  * Moving the cursor
    Use the arrow keys (UP, DOWN, LEFT, and RIGHT) to move the cursor.

  * Selecting an item
    To select an item, align the cursor with it, then press the Enter key.

  * Entering a setting value
    To enter a value for a selected item, enter the value in alphanumeric
    characters, then press the Enter key.

  * Confirming setting values
    In screens in which a number of setting values are entered, function
    key F12 (SET) appears.
    To confirm all of the entered values, press F12 (SET).
!
  * Confirming execution
    When a "yes/no" confirmation message appears, function keys F1 (YES)
    and F2 (NO) also appear.  To carry out the operation press F1 (YES), 
    and to cancel press F2 (NO).

  * Returning to the previous screen
    To return to the previous screen, press F12 (EXIT).  When F12 is not
    displayed as "EXIT", hold down the Shift key and press F12 (EXIT). 
    Pressing F12 (EXIT) in the top menu exits from the program.

  * Displaying the help screens
    To get a description of the items and the operation in a particular
    screen, display the help screen.  To display the help screen, hold down
    the Shift key and press the F1 key.  To return to the original screen,
    hold down the Shift key and press F1 once more.



[*** SCREEN 1-1 ***]

!001+003
Select the required function and press the Enter key.


  1.  FDD:  Read setup data from floppy disk.

  2.  TALLY BOX:  Read setup data from the tally box.

  3.  DEFAULT:  Read factory default values of setup data.










[*** SCREEN 1-1-1 ***]

!
Selecting "FDD" reads setup data from the inserted floppy disk to the
specified file.

Use the following procedure.

  1  Use either of the following methods to specify the file.

      o  Enter the path name and file name, then press the Enter key.
      o  Press F1 (SEL), then select the desired file from the file name
         list, and press the Enter key.

        If there are two or more pages of the list, use F9 (P-UP) and F10
        (P-DWN) to switch pages.  You can also enter a path name before
        pressing the Enter key to display the file list.

     A confirmation message appears.

  2  To carry out the operation, press F1(YES), and to cancel press F2(NO).
[*** SCREEN 1-1-2 ***]

!
Selecting "TALLY BOX" reads the setup data from the specified one of the
four internal registers of the tally box.

Use the following procedure.

  1  Press one of F1 (REG 1) to F4 (REG 4).

  2  To carry out the operation, press F1(YES), and to cancel press F2(NO).










[*** SCREEN 1-1-3 ***]

!
Selecting "DEFAULT DATA" reads the factory default values of the setup data

  To carry out the operation, press F1 (YES), and to cancel press F2 (NO).















[*** SCREEN 1-2 ***]

!002
Select the required function and press the Enter key.

  1.  SYSTEM:  Set the system configuration.

  2.  ADDRESS(S-BUS):  Set the addresses on the S-bus of the inputs and
                       outputs for each device.
  3.  ROUTER DATA:  Set the addresses on the S-bus of the inputs and
                    outputs for routing switchers.
  4.  SLOW VTR:  Set the addresses on the S-bus of the inputs and outputs
                 for slow-motion VTRs.
  5.  WIRING:  Set the configuration of the wiring connections on the S-bus

  6.  TALLY DATA COPY:  Unify tally information.

  7.  TALLY ENABLE:  Specify the TALLY ENABLE connector pin numbers for
                     each of the red, green, and yellow tallies separately.
  8.  OUTPUT:  Set the serial and parallel tally outputs.

[*** SCREEN 1-2-1 ***]
[PAGE 1]
!003|014+004
In the SYSTEM menu, make the settings for the current system configuration.
Make the necessary setting for each item, then press the Enter key.

  1.  Router(S-BUS):  Select whether or not to use the S-bus data link
                      function with a routing switcher connected.

        When it is used, select F1 (ON), and when it is not used, select
        F2 (OFF).

  2.  Router LEVEL:  Select the level of the routing switcher.

        Press one of F1 (1) to F8 (8).

  3.  SW'er:  Select whether or not to connect a digital video switcher.

        When it is used, select F1 (ON), and when it is not used, select
        F2 (OFF).

[PAGE 2]
!
  4.  SW'er LEVEL:  Select the level of the digital video switcher.

        Press one of F1 (1) to F8 (8).

  5.  SW'er TYPE:  Select the type switcher control panel used.

        If it is a 3.5-M/E type, press F1 (3.5ME), and if it is a 3-M/E
        type, press F2 (3.0ME).

  6.  DSK CONFIG:  Set the downstream keyer configuration.

        Press one of F1 (CASCD) to F4 (DUAL).

            F1 (CASCD): cascade configuration
            F2 (PARA) : parallel configuration
            F3 (INDP) : independent configuration
            F4 (DUAL) : dual cascade configuration

[PAGE 3]
!
  7.  DME TYPE:  Select the type DME tally used.

        If it is a Video/Key type, press F1 (V+K), and if it is a Video
        /External Video/Combine type, press F2 (V+E+C).

  8.  TALLY IN/GPI TYPE:  Select the type TALLY IN/GPI connector used.

        Press one of F1 (NORM) to F4 (EXT3).

        F1 (NORM): DMK / DME / Output Sel / CRK Source Sel / DSK Source Sel
        F2 (EXT1): DMK / DME / Output Sel / CRK Source Sel / EXT BOX 1
        F3 (EXT2): DMK / DME / EXT BOX 2 / EXT BOX 1
        F4 (EXT3): EXT BOX 3 / EXT BOX 2 / EXT BOX 1





[PAGE 4]
!
  9.  TALLY TYPE(SEL S-BUS GP):  Select the type tally used, and select the
                                 group tally used S-BUS.

        Press one of F1 (R/G/Y) to F11 (GP 4).

        F1(R/G/Y): Red/Green/Yellow        F7(GP2-3): 4 Group (use 2-3)
        F2(GP1-4): 4 Group (use 1-4)       F8(GP 2 ): 4 Group (use 2 only)
        F3(GP1-3): 4 Group (use 1-3)       F9(GP3-4): 4 Group (use 3-4)
        F4(GP1-2): 4 Group (use 1-2)       F10(GP 3): 4 Group (use 3 only)
        F5(GP 1 ): 4 Group (use 1 only)    F11(GP 4): 4 Group (use 4 only)
        F6(GP2-4): 4 Group (use 2-4)

 10.  TALLY BOX(1st/2nd):  Select whether settings apply to the first or
      second tally box.

        To select the first tally box press F1 (1st), and to select the
        second tally box press F2 (2nd).

[PAGE 5]
!
 11.  ROUTER INTERFACE:  Switch the interface between the routing switcher
                         and the digital video switcher (the following
                         three functions) on or off.

        o  Sending the source names set on the routing switcher to the
           digital video switcher
        o  Switching cross-points on the routing switcher from the digital
           video switcher
        o  Switching cross-points on the digital video switcher from a
           remote panel on the S-bus

 12.  SWITCHER DESTINATION WIDTH:  Select 64 or 32 according to the number
                                   of switcher outputs.

        If it is 64 press F1 (64), and if it is 32 press F2 (32).



[*** SCREEN 1-2-3 ***]

!004|015+008
In the ADDRESS menu, set the addresses on the S-bus data link of the
following devices.

Select the item, then press the Enter key.

Note that routing switcher and slow-motion VTR addresses are set in the
ROUTER menu and SLOW VTR menu, respectively.

  1.  SW'er:  digital video switcher
  2.  SW'er XPT:  digital video switcher cross-point
  3.  DSK:  DMK-7000 Digital Multi Keyer
  4.  DME:  DME-3000/7000 Digital Multi Effects
  5.  OUTPUT SEL:  output selector
  6.  CHR SOURCE SEL:  chroma key source selector
  7.  DSK SOURCE SEL:  downstream keyer source selector
  8.  EXT BOX 1-3:  External Box for parallel input


[*** SCREEN 1-2-3(1) ***]

!
In the "SW'er" item, set the input (source) and output (destination)
addresses for the digital video switcher.  Use the following procedure.

  1  Align the cursor with the setting position, enter the address number,
     and press the Enter key.

        For example, entering "001" as the first source address automatica-
        lly displays the last address as "128".  The number of destination
        outputs is determined by the setting of "DESTINATION WIDTH" in the
        SYSTEM menu.

    Note on the setting range
     The S-bus addresses are set on a 1024x1024 matrix.  As a result, it is
     not possible to specify a start address so that the last address exce-
     eds 1024 (a value of 898 or above for switcher source).  A setting of
     destination numbers which overlap with other devices is also invalid.

  2  After setting both source and destination, press F12 (SET) to confirm.
[*** SCREEN 1-2-3(2) ***]

!
In the "SW'er XPT" item, set the digital video switcher cross-point 
addresses.  Use the following procedure.

Note that in the SOURCE box is displayed the number selected for item 1,
"SW'er ".

  1  Align the cursor with the setting position (DESTINATION), enter the
     address number, and press the Enter key.

     Note on the setting range
        The S-bus addresses are set on a 1024x1024 matrix.  As a result, it
        is not possible to specify a start address so that the last address
        exceeds 1024.  A setting of destination numbers which overlap with
        other devices is also invalid.

  2  After setting both the first and last destination numbers, press F12
     (SET) to confirm.

[*** SCREEN 1-2-3(3) ***]

!
In the "DSK" item, set the input (source) and output (destination) address-
es for the DMK-7000 Digital Multi Keyer.  Use the following procedure.

  1  Align the cursor with the setting position, enter the address number,
     and press the Enter key.

        For example, entering "257" as the first source address automatica-
        lly displays the last address as "268".

     Note on the setting range
        The S-bus addresses are set on a 1024x1024 matrix.  As a result, it
        is not possible to specify a start address so that the last address
        exceeds 1024 (a value of 1014 or above for the downstream keyer).
        A setting of destination numbers which overlap with other devices is
        also invalid.

  2  After setting both source and destination, press F12 (SET) to confirm.

[*** SCREEN 1-2-3(4) ***]

!
In the "DME" item, set the input (source) and output (destination) 
addresses for the Digital Multi Effects.  Use the following procedure.

  1  Align the cursor with the setting position, enter the address number,
     and press the Enter key.

        For example, entering "257" as the first source address automatica-
        lly displays the last address as "268".

     Note on the setting range
        The S-bus addresses are set on a 1024x1024 matrix.  As a result, it
        is not possible to specify a start address so that the last address
        exceeds 1024 (a value of 1014 or above for the DME).  A setting of
        destination numbers which overlap with other devices is also invalid

  2  After setting both source and destination, press F12 (SET) to confirm.


[*** SCREEN 1-2-3(5) ***]

!
In the "OUTPUT SEL" item, set the input (source) and output (destination) 
addresses for the output selector.  Use the following procedure.

  1  Align the cursor with the setting position, enter the address number,
     and press the Enter key.

        For example, entering "257" as the first source address automatica-
        lly displays the last address as "268".

     Note on the setting range
        The S-bus addresses are set on a 1024x1024 matrix.  As a result, it
        is not possible to specify a start address so that the last address
        exceeds 1024 (a value of 1014 or above when there are 12 inputs).
        A setting of destination numbers which overlap with other devices is
        also invalid.

  2  After setting both source and destination, press F12 (SET) to confirm.

[*** SCREEN 1-2-3(6) ***]

!
In the "CHR SOURCE SEL" item, set the input (source) and output (destina-
tion) addresses for the source selector for chroma key.
Use the following procedure.

  1  Align the cursor with the setting position, enter the address number,
     and press the Enter key.

        For example, entering "257" as the first source address automatica-
        lly displays the last address as "268".

     Note on the setting range
        The S-bus addresses are set on a 1024x1024 matrix.  As a result, it
        is not possible to specify a start address so that the last address
        exceeds 1024 (a value of 1014 or above when there are 12 inputs).
        A setting of destination numbers which overlap with other devices is
        also invalid.

  2  After setting both source and destination, press F12 (SET) to confirm.
[*** SCREEN 1-2-3(7) ***]

!
In the "DSK SOURCE SEL" item, set the input (source) and output (destina-
tion) addresses for the source selector for the downstream keyer.
Use the following procedure.

  1  Align the cursor with the setting position, enter the address number,
     and press the Enter key.

        For example, entering "257" as the first source address automatica-
        lly displays the last address as "268".

     Note on the setting range
        The S-bus addresses are set on a 1024x1024 matrix.  As a result, it
        is not possible to specify a start address so that the last address
        exceeds 1024 (a value of 1014 or above when there are 12 inputs).
        A setting of destination numbers which overlap with other devices is
        also invalid.

  2  After setting both source and destination, press F12 (SET) to confirm.
[*** SCREEN 1-2-3(8) ***]

!
In the "EXT BOX 1-3" item, set the input (source) and output (destination) 
addresses for the External Box for parallel input.
Use the following procedure.

  1  Align the cursor with the setting position, enter the address number,
     and press the Enter key.

        For example, entering "257" as the first source address automatica-
        lly displays the last address as "272".

     Note on the setting range
        The S-bus addresses are set on a 1024x1024 matrix.  As a result, it
        is not possible to specify a start address so that the last address
        exceeds 1024 (a value of 1010 or above for the EXT BOX).
        A setting of destination numbers which overlap with other devices is
        also invalid.

  2  After setting both source and destination, press F12 (SET) to confirm.
[*** SCREEN 1-2-4 ***]

!005|016
In the ROUTER DATA menu, set the addresses on the S-bus data link for 
routing switchers.  Use the following procedure.

  1  To set the input (source) address select item 1, "SOURCE," and to set
     the output (destination) address select item 2, "DESTINATION."

  2  Enter the virtual address to be assigned to the routing switcher,
     and press the Enter key.  To cancel an assignment, press F1 (DEL).

     Note on the setting range
        The S-bus addresses are set on a 1024x1024 matrix.  As a result,
        values outside this range cannot be specified.  A setting of
        numbers which overlap with other devices is also invalid.

  3  After setting all of the required addresses, press F12 (SET) to 
     confirm.


[*** SCREEN 1-2-5 ***]

!006|017
In the SLOW VTR menu, set the addresses on the S-bus data link for 
slow-motion VTRs.

Use the following procedure.

  1  Align the cursor with the slow-motion VTR number, and press the Enter
     key.

  2  Enter the address to be assigned to the VTR, and press the Enter key.
     To cancel an assignment, press F1 (DEL).

     Note on the setting range
        The S-bus addresses are set on a 1024x1024 matrix.  As a result,
        values outside this range cannot be specified.  A setting of desti-
        nation numbers which overlap with other devices is also invalid.



[*** SCREEN 1-2-6 ***]

!007|018
In the WIRING menu, set the configuration of the wiring connections on the
S-bus.

Use the following procedure.

  1  Align the cursor with the setting position, and press the Enter key.

        For example, to connect source 001 to destination 003, first select
        "001" on the left, then enter "003" on the right.  To delete a 
        connection, press F1 (DEL).

        Use F9 (P-UP) and F10 (P-DWN) to switch pages.

  2  After setting all of the required addresses, press F12 (SET) to
     confirm.



[*** SCREEN 1-2-7 ***]

!008|019
Use the TALLY DATA COPY menu to unify tally information, so that the tally
information at one address (the copy source) is always output at another
address (the copy destination).

Use the following procedure.

  1  Align the cursor with the setting position, enter a numeric value,
     then press the Enter key.

        For example, to copy from 111 to 222, first select "111" on the
        left, then enter "222" on the right.  To delete a connection,
        press F1 (DEL).

        Use F9 (P-UP) and F10 (P-DWN) to switch pages.

  2  After setting all of the required addresses, press F12 (SET) to
     confirm.

[*** SCREEN 1-2-8 ***]
[PAGE 1]
!009|020+001
In the TALLY ENABLE menu, set up the groups and TALLY ENABLE of tallies
separately for each color (red, green, and yellow).
Use the following procedure.

  1  Select one of RED TALLY, GREEN TALLY, or YELLOW TALLY.

  2  Check that the cursor is in the "TYPE" row (if in the "ENABLE" row,
     press F1 to switch), then press one of F6 to F11 to select the group.
     If you select "LINE", "SLOW", or "ME", next enter the required number.
     To delete a selection, press F2 (DEL).

        F6 (LINE):  line outputs 1 to 3
        F7 (SLOW):  slow-motion VTRs 1 to 32
        F8 (PP):  PGM/PST bank on the switcher
        F9 (ME):  M/E-1 to M/E-3 banks on the switcher
        F10 (ALL):  the M/E-1 to M/E-3 and PGM/PST banks on the switcher
        F11 (AUX):  the switcher auxiliary bus bank
  SHIFT+F8 (PST):   PST bank on the switcher (for DVS-M1000C only)
[PAGE 2]
!

  3  Press F1 to select "ENABLE", and enter the number of the pin of the
     TALLY ENABLE connector which will switch this tally group on and off.
     To delete a group setting, press F2 (DEL).

  4  After making all of the required settings, press F12 (SET) to confirm.












[*** SCREEN 1-2-8 ***]
[PAGE 1]
!022|022+001
In the TALLY ENABLE menu, set up the groups and TALLY ENABLE of tallies
separately for each color (R-1 to G-4).Use the following procedure.

  1  Select one of R-1 TALLY to G-4 TALLY.

  2  Check that the cursor is in the "TYPE" row (if in the "ENABLE" row,
     press F1 to switch), then press one of F6 to F11 to select the group.
     If you select "LINE", "SLOW", or "ME", next enter the required number.
     To delete a selection, press F2 (DEL).

        F6 (LINE):  line outputs 1 to 3
        F7 (SLOW):  slow-motion VTRs 1 to 32
        F8 (PP):  PGM/PST bank on the switcher
        F9 (ME):  M/E-1 to M/E-3 banks on the switcher
        F10 (ALL):  the M/E-1 to M/E-3 and PGM/PST banks on the switcher
        F11 (AUX):  the switcher auxiliary bus bank
  SHIFT+F8 (PST):   PST bank on the switcher (for DVS-M1000C only)

[PAGE 2]
!

  3  Press F1 to select "ENABLE", and enter the number of the pin of the
     TALLY ENABLE connector which will switch this tally group on and off.
     To delete a group setting, press F2 (DEL).

  4  After making all of the required settings, press F12 (SET) to confirm.












[*** SCREEN 1-2-9 ***]

!010|021+003
In the OUTPUT menu, select the tally information to be output from the
serial (SERIAL TALLY 1 and 2) and parallel (TALLY OUT 1 to 9) tally output
connectors.

  Select the connector for which you wish to make the settings, and press
  the Enter key.












[*** SCREEN 1-2-9-1 ***]

!
If you selected "SERIAL TALLY 1" or "SERIAL TALLY 2," you can now select
the tally information to be output from the serial (SERIAL TALLY 1 and 2)
connectors.

Use the following procedure.

  1  Press one of F3 (RED), F4 (GREEN), and F5 (YELLW), to select the tally

  2  Press F1 (TALLY), and align the cursor with the SERIAL TALLY protocol
     tally number, and enter the address you wish to output.

  3  After making all of the required settings, press F12 (SET) to confirm.

  4  Repeat steps 1 to 3 for each of the serial connectors.




[*** SCREEN 1-2-9-2 ***]
[PAGE 1]
!
If you selected one of "TALLY OUT 1" to "TALLY OUT 9", you can now select
the tally information to be output from the parallel (TALLY OUT 1 to 9)
connectors.  Use the following procedure.

  1  Check that the cursor is in the "TYPE" box (if on a pin number, press
     F1 to switch), then press one of F3 to F11 to select the tally to be
     output.  If you select "LINE", "SLOW", or "ME", next enter the
     required number.  To switch off a tally output, press F2 (OFF).
        F3 (RED):    red
        F4 (GREEN):  green
        F5 (YELLW):  yellow
        F6 (LINE):   line outputs 1 to 3
        F7 (SLOW):   slow-motion VTRs 1 to 32
        F8 (PP):     PGM/PST bank on the switcher
        F9 (ME):     M/E-1 to M/E-3 banks on the switcher
        F10 (ALL):   the M/E-1 to M/E-3 and PGM/PST banks on the switcher
        F11 (AUX):   the switcher auxiliary bus bank
  SHIFT+F8 (PST):    PST bank on the switcher (for DVS-M1000C only)
[PAGE 2]
!

  2  Press F1 to, and enter the address you wish to output to the TALLY OUT
     connector pin number.

  3  After making all of the required settings, press F12 (SET) to confirm.

  4  Repeat steps 1 to 3 for each of the parallel connectors.  











[*** SCREEN 1-2-9 ***]

!023|023+003
In the OUTPUT menu, select the tally information to be output from the
serial (SERIAL TALLY 1 and 2) and parallel (TALLY OUT 1 to 9) tally output
connectors.

  Select the connector for which you wish to make the settings, and press
  the Enter key.












[*** SCREEN 1-2-9-1 ***]

!
If you selected "SERIAL TALLY 1" or "SERIAL TALLY 2", you can now select
the tally information to be output from the serial (SERIAL TALLY 1 and 2)
connectors.

Use the following procedure.

  1  Press one of F3 (RED) and F4 (GREEN), to select the tally, enter the
     group number, and press the Enter key.

  2  Press F1 (TALLY), and align the cursor with the SERIAL TALLY protocol
     tally number, and enter the address you wish to output.

  3  After making all of the required settings, press F12 (SET) to confirm.

  4  Repeat steps 1 to 3 for each of the serial connectors.



[*** SCREEN 1-2-9-2 ***]
[PAGE 1]
!
If you selected one of "TALLY OUT 1" to "TALLY OUT 9", you can now select
the tally information to be output from the parallel (TALLY OUT 1 to 9)
connectors.  Use the following procedure.

  1  Check that the cursor is in the "TYPE" box (if on a pin number, press
     F1 to switch), then press one of F3 to F11 to select the tally to be
     output.  If you select "RED", "GREEN", "LINE", "SLOW", or "ME", next
     enter the required number.  To switch off a tally output, press F2(OFF)
        F3 (RED):    red
        F4 (GREEN):  green

        F6 (LINE):   line outputs 1 to 3
        F7 (SLOW):   slow-motion VTRs 1 to 32
        F8 (PP):     PGM/PST bank on the switcher
        F9 (ME):     M/E-1 to M/E-3 banks on the switcher
        F10 (ALL):   the M/E-1 to M/E-3 and PGM/PST banks on the switcher
        F11 (AUX):   the switcher auxiliary bus bank
  SHIFT+F8 (PST):    PST bank on the switcher (for DVS-M1000C only)
[PAGE 2]
!

  2  Press F1 to, and enter the address you wish to output to the TALLY OUT
     connector pin number.

  3  After making all of the required settings, press F12 (SET) to confirm.

  4  Repeat steps 1 to 3 for each of the parallel connectors.  











[*** SCREEN 1-3 ***]

!011+002
Select the required operation, and press the Enter key.


  1.  FDD:  Write setup data to a floppy disk.

  2.  TALLY BOX:  Write setup data to a tally box register.












[*** SCREEN 1-3-1 ***]

!
Selecting "FDD" writes the current settings of the setup data to the floppy
disk with the specified file name.  Use the following procedure.

  1  Use either of the following methods to enter the name of the file in
     which the setup data is to be written:

        o  Enter the path name and file name, then press the Enter key.
        o  To write to an existing file, display the list of file names,
           select the required file, and press the Enter key.

        If there are two or more pages of the list, use F9 (P-UP) and F10
        (P-DWN) to switch pages.  You can also enter a path name before
        pressing the Enter key to display the file list.

     A confirmation message appears.

  2  To carry out the operation, press F1(YES), and to cancel press F2(NO).

[*** SCREEN 1-3-2 ***]

!
Selecting "TALLY BOX" writes the setup data to the specified one of the
four internal registers of the tally box.

Use the following procedure.

  1  Press one of F1 (REG 1) to F4 (REG 4).

     A confirmation message appears.

  2  To carry out the operation, press F1(YES), and to cancel press F2(NO).








[*** SCREEN 1-4 ***]

!012+002
Select the required operation, and press the Enter key.

  1.  USED REGISTER:  Select the register containing the setup data on
                      which the tally box operates.  Carrying out the
                      selection restarts the tally box.

  2.  SAVE FLASH MEM:  Write the contents of the four registers in the
                       tally box to flash memory.










[*** SCREEN 1-4-1 ***]

!
Selecting "USED REGISTER" causes the tally box to read the contents of the
specified register and restart.

Use the following procedure.

  1  Press one of F1 (REG 1) to F4 (REG 4).

  2  To carry out the operation, press F1(YES), and to cancel press F2(NO).










[*** SCREEN 1-4-2 ***]

!
Selecting "SAVE FLASH MEM" writes the contents of the registers in the
tally box (including the currently used register) to flash memory.

Since the settings saved in flash memory are retained when the tally box is
powered off, you can use this method to save setup data for future use.

  To save the registers press F1 (YES), and to cancel press F2 (NO).











[*** SCREEN 1-5 ***]

!013
Use the SINGLE SHOT menu to send individual items of setup data to a 
specified register.  Use the following procedure.

  1  Select item 1, "SELECT REGISTER."

  2  Press one of F1 (REG 1) to F4 (REG 4), to select the register to which
     to send the setup data.

  3  Press F12 (SET) to confirm.

  4  If required, select any of items 2 to 10 to set individual setup
     items.  The method of setting is the same as in the normal procedure
     (selecting the items from the SETUP menu), but the operation of the
     system is different in the following respects:
       o  The number of the destination register is displayed.
       o  Selecting an item displays the current contents of the register.
       o  When you set an item, the setting is immediately sent to the reg-
          ister (except, however, for the RED/GREEN/YELLOW tally settings).
